FTPC SLOW CONTROL SCHEME

VME CPU

MVME 167

VME-Arcnet interface CC121

Digital I/O Acromag AVME 948x

Readout board interface RADSTONE

VME serial interface MVME712M

VME crate

Le Croy 1454 HV power supply

Low voltage power supply

Readout boards

SUN Workstation

Fiber

Special (LBL)

Coax. RG58

Coax. 93Ω (SVT)