h1 Entries 167757 Mean 0.9687 RMS 0.6733

DCA to PV

0 0.5 1 1.5 2 2.5 3 0 200 400 600 800 1000

1200

1400

ssd hit = 0 pt<0.5 pt>=0.5 && pt<1 pt>=1 && pt<1.5 pt>=1.5

DCA to PV

0 0.5 1 1.5 2 2.5 3 0 100 200 300 400 500 600 700 800 h1 Entries 58684 Mean 0.6918 RMS 0.5689

ssd hit = 1 pt<0.5 pt>=0.5 && pt<1 pt>=1 && pt<1.5 pt>=1.5