h1 Entries 15406 Mean 0.6781 RMS 0.571

DCA to PV

0 0.5 1 1.5 2 2.5 3 0 20 40 60 80 100 120 140 160 180 200 220 240

= 0.002 zσ pt<0.5 pt>=0.5 && pt<1 pt>=1 && pt<1.5 pt>=1.5

DCA to PV

0 0.5 1 1.5 2 2.5 3 0 20 40 60 80 100 120 140 160 180 200 220 h1 Entries 16658 Mean 0.7133 RMS 0.5719

= 0.07 zσ pt<0.5 pt>=0.5 && pt<1 pt>=1 && pt<1.5 pt>=1.5