h1 Entries 30421 Mean 0.4912 RMS 0.197

DCAPARENTOPRIMVTX to PV

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1 0

100

200

300

400

500

600

ssd hit = 0 DecayLengthV0>=2 && DecayLengthV0<4 DecayLengthV0>=4 &&DecayLengthV0<6 DecayLengthV0>=6 &&DecayLengthV0<8 DecayLengthV0>=8

DCAPARENTOPRIMVTX to PV

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1 0 2 4 6 8 10 12 14 16 18 h1 Entries 702 Mean 0.4558 RMS 0.2019

ssd hit = 1 DecayLengthV0>=2 && DecayLengthV0<4 DecayLengthV0>=4 &&DecayLengthV0<6 DecayLengthV0>=6 &&DecayLengthV0<8 DecayLengthV0>=8