h1 Entries 52817 Mean 0.4894 RMS 0.1985

DCAPARENTOPRIMVTX to PV

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1 0

200

400

600

800

1000 ssd hit = 0 nfit_Neg>10 && nfit_Pos>10 nfit_Neg>15 && nfit_Pos>15 nfit_Neg>20 && nfit_Pos>20 nfit_Neg>30 && nfit_Pos>30

DCAPARENTOPRIMVTX to PV

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1 0 5 10 15 20 25 30 35 40 45 h1 Entries 2343 Mean 0.4455 RMS 0.2075 ssd hit = 1 nfit_Neg>10 && nfit_Pos>10 nfit_Neg>15 && nfit_Pos>15 nfit_Neg>20 && nfit_Pos>20 nfit_Neg>30 && nfit_Pos>30