eta -2 -1.5 -1 -0.5 0 0.5 1 1.5 2 0

0.2

0.4

0.6

0.8

1 No Ssd Tracking Ssd Tracking eta

phi -4 -3 -2 -1 0 1 2 3 4 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 No Ssd Tracking Ssd Tracking

phi

length

0 50 100 150 200 250 300 350 400 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 No Ssd Tracking Ssd Tracking

length

chi2

0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 No Ssd Tracking Ssd Tracking chi2