/ ndf

2χ 442 / 297 Prob 3.702e-08 Constant 10.6± 1116 MPV 0.004± 0.583 Sigma 0.0022± 0.2549

DCA to prim vertex

0 0.5 1 1.5 2 2.5 3 0 20 40 60 80 100 120 140 160 180 200 220 2χ 261.7 / 287 Prob 0.8559 Constant 11.1± 636.7 MPV 0.0033± 0.2905 Sigma 0.0018± 0.1267

No Ssd Tracking Ssd Tracking

/ ndf

2χ 442 / 297 Prob 3.702e-08 Constant 10.6± 1116 MPV 0.004± 0.583 Sigma 0.0022± 0.2549

DCA to prim vertex

0 0.5 1 1.5 2 2.5 3 0 20 40 60 80 100 120 140 160 180 200 220

/ ndf

2χ 261.7 / 287 Prob 0.8559 Constant 11.1± 636.7 MPV 0.0033± 0.2905 Sigma 0.0018± 0.1267

DCA to prim vertex

0 0.5 1 1.5 2 2.5 3 0

20

40

60

80

100

120