Benchmarks

Root I/O performance compared to Zebra I/O 20% to 100% faster (see table on our Web site)

Root data base size compared to Zebra and Objectivity. - typically two times smaller than Zebra - More than a factor 3 smaller than Objectivity (in test)

Root histogram package compared to Hbook and LHC++ 80% faster than Hbook XXX% faster than LHC++

Other reports soon available eg, Phobos comparing Root and Objectivity

/user/brun/root/slides/hepvis98/benchmarks.C