Frameworks : Hierarchy

Experiment specific applications

High level applications, experiment independant

Basic framework used by all applications

Conditions to move users to OO

Alice Atlas CMS LHCB

NA49 Hades Integral CDF RHIC

Event generators

Detector simulation

DAQ systems

Input/Output, User Interface Graphics, Histograms, Ntuples, etc..

High level applications must exist High level applications need the basic framework

/user/brun/root/slides/barcelona/hierarchy.C