-0.05 0 0.05 0.1 0.15 0.2 0.25 0.3 0.35 0.4

-10 -7.5 -5 -2.5 0 2.5 5 7.5 10

Charge Fraction Induced on Pad Charge Over Pad Centroid

Pad Number

Charge Induced on Pad