Tower 5TD7 ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3084 38859 36.56 204.9 0.000 0.000 0.3886E+05

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4084 38529 36.60 200.5 0.000 0.000 0.3853E+05

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5084 38973 33.69 188.9 0.000 0.000 0.3897E+05