0 20 40 60 80 100 1

10

10^2

ADC, Tower=05TC12c3 05TC12c3

Entries 495 Mean 5.061 RMS 0.5863 Underflow 0 Overflow 0 Integral 495 / ndf

2χ 0.1251 / 1 Prob 0.7235 Constant 2.839±

2.189 Slope 0.2645 ± -0.1579

ADC, Tower=05TC12c3

0 20 40 60 80 100 0 100 200 300 400 500 600 700 800 900 efficiency for ADC, Tower=05TC12c3 05TC12c3

Entries 0 Mean 5.951 RMS 2.46 Underflow 0 Overflow 0 Integral 0.3926 / ndf

2χ 0.02314 / 1 Prob 0.8791 Constant 1.739e+04 ± 975.7 Mean 55.93± 52.68 Sigma 6.137± 8.782

efficiency for ADC, Tower=05TC12c3