0 20 40 60 80 100 10

10^2

10^3

10^4

10^5

ADC, Tower=05TD04c3 05TD04c3

Entries 97350 Mean 5.961 RMS 1.109 Underflow 0 Overflow 0 Integral 9.735e+04 / ndf

2χ 5.44e-13 / 0 Prob 0 Constant 2.569±

34.26 Slope 0.2852 ± -2.926

ADC, Tower=05TD04c3

0 20 40 60 80 100 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 efficiency for ADC, Tower=05TD04c3 05TD04c3

Entries 0 Mean 6.893 RMS 1.652 Underflow 0 Overflow 0 Integral 2.486 / ndf

2χ 3.135e-15 / 0 Prob 0 Constant 0.09988 ± 1.152 Mean 0.03394 ± 7.867 Sigma 0.1299 ± 1.142

efficiency for ADC, Tower=05TD04c3