0 20 40 60 80 100

1

10

10^2

ADC, Tower=05TD06c3 05TD06c3

Entries 585 Mean 6.159 RMS 2.144 Underflow 0 Overflow 0 Integral 585 / ndf

2χ 5.348 / 6 Prob 0.5 Constant 0.8754 ± 7.639 Slope 0.08337 ± -0.4429

ADC, Tower=05TD06c3

0 20 40 60 80 100

-0.05

0

0.05

0.1

0.15

0.2 efficiency for ADC, Tower=05TD06c3 05TD06c3

Entries 0 Mean 10.54 RMS 5.861 Underflow 0 Overflow 0 Integral 0.7042 / ndf

2χ 1.871 / 6 Prob 0.9312 Constant 1.741e+08 ± 2.651e+07 Mean 77.37±

-146.3 Sigma 9.934± 24.88

efficiency for ADC, Tower=05TD06c3