0 20 40 60 80 100 1

10

10^2

ADC, Tower=05TD10c3 05TD10c3

Entries 121 Mean 5.198 RMS 1.073 Underflow 0 Overflow 0 Integral 121 / ndf

2χ 2.069e-15 / 0 Prob 0 Constant 8.33±

4.505 Slope 0.7117 ± -0.3466

ADC, Tower=05TD10c3

0 20 40 60 80 100 0 0.02

0.04

0.06

0.08 0.1 0.12

0.14

0.16 efficiency for ADC, Tower=05TD10c3 05TD10c3

Entries 0 Mean 5.753 RMS 2.06 Underflow 0 Overflow 0 Integral 0.1558 / ndf

2χ 1.173e-10 / 0 Prob 0 Constant 0.2403±

0.009972 Mean 806.6± -7.78 Sigma 23.27± 24.66

efficiency for ADC, Tower=05TD10c3