0 20 40 60 80 100

10^{-2}

10^{-1}

1

10 ADC, Tower=06TA12c3 06TA12c3

Entries 9 Mean 5 RMS -0 Underflow 0 Overflow 0 Integral 9 / ndf

2χ 0 / -2 Prob 0 Constant 1.414±

-20.72 Slope 1.414±

-1.184e-16

ADC, Tower=06TA12c3

0 20 40 60 80 100 0

0.05

0.1

0.15

0.2

0.25

0.3 efficiency for ADC, Tower=06TA12c3 06TA12c3

Entries 0 Mean 5 RMS -0 Underflow 0 Overflow 0 Integral 0.1957 / ndf

2χ 0 / -3 Prob 0 Constant 1.414±

0.2724 Mean 1.414±

16.91 Sigma 75.4±

29.35

efficiency for ADC, Tower=06TA12c3