0 20 40 60 80 100 1

10

10^2

10^3

ADC, Tower=07TD04c3 07TD04c3

Entries 2881 Mean 5.375 RMS 3.274 Underflow 0 Overflow 20 Integral 2859 / ndf

2χ 1.21 / 2 Prob 0.5461 Constant 2.756±

-0.5799 Slope 0.145±

0.05308

ADC, Tower=07TD04c3

0 20 40 60 80 100

-0.2 0 0.2 0.4 0.6 0.8 1 1.2 efficiency for ADC, Tower=07TD04c3 07TD04c3

Entries 0 Mean 40.28 RMS 31.86 Underflow 0 Overflow 0 Integral 5.987 / ndf

2χ 5.121 / 7 Prob 0.6452 Constant 1.791±

1.586 Mean 1.242±

4.477 Sigma 0.3677 ± 1.421

efficiency for ADC, Tower=07TD04c3