0 20 40 60 80 100

1

10

ADC, Tower=07TD05c3 07TD05c3

Entries 160 Mean 18.28 RMS 17.87 Underflow 0 Overflow 18 Integral 142 / ndf

2χ 4.621 / 7 Prob 0.7061 Constant 0.4447±

3.347 Slope 0.02901 ± -0.09133

ADC, Tower=07TD05c3

0 20 40 60 80 100

-0.2

0

0.2

0.4

0.6

0.8 efficiency for ADC, Tower=07TD05c3 07TD05c3

Entries 0 Mean 59.88 RMS 28.4 Underflow 0 Overflow 0 Integral 1.521 / ndf

2χ 3.399 / 17 Prob 0.9998 Constant 0.038±

0.03398 Mean 71.52±

47.87 Sigma 34.77±

28.17

efficiency for ADC, Tower=07TD05c3