0 20 40 60 80 100

1

10

ADC, Tower=07TD06c3 07TD06c3

Entries 147 Mean 16.57 RMS 14.96 Underflow 0 Overflow 6 Integral 141 / ndf

2χ 10.35 / 7 Prob 0.1694 Constant 0.651±

3.196 Slope 0.04301 ± -0.08542

ADC, Tower=07TD06c3

0 20 40 60 80 100

-0.1

-0.05 0 0.05 0.1 0.15 0.2 0.25 0.3 efficiency for ADC, Tower=07TD06c3 07TD06c3

Entries 0 Mean 44.56 RMS 27.35 Underflow 0 Overflow 0 Integral 0.9134 / ndf

2χ 2.9 / 16 Prob 0.9999 Constant 7.809±

0.02855 Mean 2.386±

76.3 Sigma 84.15±

84.17

efficiency for ADC, Tower=07TD06c3