0 20 40 60 80 100

1

10

ADC, Tower=07TD08c3 07TD08c3

Entries 46 Mean 14.15 RMS 17.72 Underflow 0 Overflow 5 Integral 40 / ndf

2χ 4.111 / 2 Prob 0.128 Constant 1.246±

2.779 Slope 0.1073 ± -0.1529

ADC, Tower=07TD08c3

0 20 40 60 80 100

0

0.2

0.4

0.6

0.8

1 efficiency for ADC, Tower=07TD08c3 07TD08c3

Entries 0 Mean 55.3 RMS 35.03 Underflow 0 Overflow 0 Integral 2.501 / ndf

2χ 0.3439 / 4 Prob 0.9868 Constant 0.3084 ± 0.1857 Mean 12.63±

32.52 Sigma 8.48±

10.47

efficiency for ADC, Tower=07TD08c3