0 20 40 60 80 100 1

10

10^2

10^3

10^4

ADC, Tower=07TE06c3 07TE06c3

Entries 78720 Mean 4.438 RMS 1.146 Underflow 0 Overflow 11 Integral 7.871e+04 / ndf

2χ 3.095e-10 / 0 Prob 0 Constant 1.684±

-1.035 Slope 0.079±

0.115

ADC, Tower=07TE06c3

0 20 40 60 80 100

-0.2

0

0.2

0.4

0.6

0.8 efficiency for ADC, Tower=07TE06c3 07TE06c3

Entries 0 Mean 24.96 RMS 30.42 Underflow 0 Overflow 0 Integral 3.649 / ndf

2χ 2.74 / 2 Prob 0.2542 Constant 0.8882 ± 2.278 Mean 0.2648 ± 5.139 Sigma 0.1319 ± 1.079

efficiency for ADC, Tower=07TE06c3