0 20 40 60 80 100

1

10

ADC, Tower=07TE07c3 07TE07c3

Entries 176 Mean 17.84 RMS 15.88 Underflow 0 Overflow 10 Integral 166 / ndf

2χ 14.26 / 7 Prob 0.04667 Constant 0.3578±

3.336 Slope 0.02264 ± -0.08482

ADC, Tower=07TE07c3

0 20 40 60 80 100

-0.05

0

0.05

0.1

0.15

0.2 efficiency for ADC, Tower=07TE07c3 07TE07c3

Entries 0 Mean 41.4 RMS 21.39 Underflow 0 Overflow 0 Integral 1.194 / ndf

2χ 6.539 / 16 Prob 0.9812 Constant 0.1834 ± 0.05271 Mean 364.2±

182.2 Sigma 65.97±

131.6

efficiency for ADC, Tower=07TE07c3