0 20 40 60 80 100

1

10

ADC, Tower=08TA05c3 08TA05c3

Entries 105 Mean 16.09 RMS 14.73 Underflow 0 Overflow 2 Integral 103 / ndf

2χ 1.681 / 6 Prob 0.9466 Constant 0.5551±

2.786 Slope 0.03644 ± -0.06166

ADC, Tower=08TA05c3

0 20 40 60 80 100

-0.1

0

0.1

0.2

0.3

0.4 efficiency for ADC, Tower=08TA05c3 08TA05c3

Entries 0 Mean 41.49 RMS 20.09 Underflow 0 Overflow 0 Integral 0.9842 / ndf

2χ 1.189 / 12 Prob 1 Constant 0.08688 ± 0.04501 Mean 115.5± 47.03 Sigma 76.98± 27.19

efficiency for ADC, Tower=08TA05c3