0 20 40 60 80 100

1

10

ADC, Tower=08TA06c3 08TA06c3

Entries 128 Mean 11.65 RMS 12.17 Underflow 0 Overflow 8 Integral 120 / ndf

2χ 11.96 / 7 Prob 0.102 Constant 0.4972 ± 3.676 Slope 0.03484 ± -0.1457

ADC, Tower=08TA06c3

0 20 40 60 80 100

-0.2

0

0.2

0.4

0.6

0.8 efficiency for ADC, Tower=08TA06c3 08TA06c3

Entries 0 Mean 53.74 RMS 34.11 Underflow 0 Overflow 0 Integral 0.9998 / ndf

2χ 3.322 / 12 Prob 0.9928 Constant 0.03359 ± 0.02256 Mean 387.5±

49.98 Sigma 81.09±

98.61

efficiency for ADC, Tower=08TA06c3