0 20 40 60 80 100

1

10

ADC, Tower=08TA07c3 08TA07c3

Entries 78 Mean 11.54 RMS 7.55 Underflow 0 Overflow 2 Integral 74 / ndf

2χ 4.532 / 5 Prob 0.4757 Constant 0.6143 ± 4.625 Slope 0.04962 ± -0.2229

ADC, Tower=08TA07c3

0 20 40 60 80 100

-0.05

0

0.05

0.1

0.15

0.2 efficiency for ADC, Tower=08TA07c3 08TA07c3

Entries 0 Mean 24.84 RMS 10.6 Underflow 0 Overflow 0 Integral 0.4517 / ndf

2χ 2.508 / 9 Prob 0.9807 Constant 370±

21.43 Mean 463.1±

390.7 Sigma 64.21±

100.7

efficiency for ADC, Tower=08TA07c3