0 20 40 60 80 100

1

ADC, Tower=08TB07c3 08TB07c3

Entries 21 Mean 29.53 RMS 30.89 Underflow 0 Overflow 5 Integral 15 / ndf

2χ 0.4 / 1 Prob 0.5271 Constant 1.869±

0.1823 Slope 0.1378±

-1.92e-08

ADC, Tower=08TB07c3

0 20 40 60 80 100

-0.2

0

0.2

0.4

0.6

0.8

1 efficiency for ADC, Tower=08TB07c3 08TB07c3

Entries 0 Mean 68.42 RMS 22.24 Underflow 0 Overflow 0 Integral 4.581 / ndf

2χ 0.4229 / 2 Prob 0.8094 Constant 0.08021 ± 0.0585 Mean 161±

9.714 Sigma 131.4±

17.03

efficiency for ADC, Tower=08TB07c3