0 20 40 60 80 100

1

10 ADC, Tower=08TD04c3 08TD04c3

Entries 15 Mean 53 RMS 22.19 Underflow 0 Overflow 5 Integral 7 / ndf

2χ 6.524e-14 / -1 Prob 0 Constant 11.18±

-11.81 Slope 0.4862 ± 0.5438

ADC, Tower=08TD04c3

0 20 40 60 80 100

-0.2 0 0.2 0.4 0.6 0.8 1 1.2 efficiency for ADC, Tower=08TD04c3 08TD04c3

Entries 0 Mean 57.87 RMS 22.83 Underflow 0 Overflow 0 Integral 1.883 / ndf

2χ 2.256e-12 / -1 Prob 0 Constant 13.54±

0.4795 Mean 189.3±

31.28 Sigma 85.95±

13.75

efficiency for ADC, Tower=08TD04c3