06TC01c1 Entries 1784 Mean 422.1 RMS 270.6

8 257 506 755 1004 0

5

10

15

20

25 ADC, Tower=TC01c1

06TC01c1 Entries 1672 Mean 400.6 RMS 250.1

8 257 506 755 1004 0

5

10

15

20

25

ADC, Tower=TC01c1

06TC01c1 Entries 1360 Mean 493.1 RMS 213.5

8 257 506 755 1004 0

5

10

15

20

25

30

ADC, Tower=TC01c1

06TC01c1 Entries 2061 Mean 425.2 RMS 242.3

8 257 506 755 1004 0

10

20

30

40

50

ADC, Tower=TC01c1