8 506 1004 1502 2000 0 5

10

15 20

25

30

35

ADC, Tower=TA01c1 05TA01c1

Entries 1691 Mean 398.9

RMS 222.5

05TB01c1 Entries 1729

Mean 441.7 RMS 315 Underflow 0

8 506 1004 1502 2000 0 5 10 15 20 25 ADC, Tower=TB01c1

Mean 478.9 RMS 300

8 506 1004 1502 2000 0

5

10

15

20

25

ADC, Tower=TC01c1 05TC01c1

Entries 1677 Mean 381.9

RMS 208

8 506 1004 1502 2000 0

10 20

30

40 50

60 70

80 ADC, Tower=TD01c1 05TD01c1

Entries 1646 Mean 108.7

RMS 59.44

8 506 1004 1502 2000 0

5

10

15

20

25

ADC, Tower=TE01c1 05TE01c1

Entries 1692 Mean 371.9

RMS 232.1

8 506 1004 1502 2000 0

5 10 15 20 25 30 35 40

ADC, Tower=TA01c1 06TA01c1

Entries 1467 Mean 280.9

RMS 139

8 506 1004 1502 2000 0 5 10 15 20 25 30 35 40 45

ADC, Tower=TB01c1 06TB01c1

Entries 1622 Mean 298.3

RMS 169.3

8 506 1004 1502 2000 0

5

10

15

20

25

ADC, Tower=TC01c1 06TC01c1

Entries 1672 Mean 400.6

RMS 250.1

8 506 1004 1502 2000 -1

-0.5

0

0.5

1

ADC, Tower=TD01c1 06TD01c1

Entries 0 Mean 0

RMS 0

8 506 1004 1502 2000 0

5

10

15

20

25

ADC, Tower=TE01c1 06TE01c1

Entries 1668 Mean 975.6

RMS 670.1

8 506 1004 1502 2000 0 2 4 6 8 10 12 14 16 18 20 22 24 ADC, Tower=TA01c1 07TA01c1

Entries 1700 Mean 720.8

RMS 597.8

8 506 1004 1502 2000 0

5

10

15

20

25

30

ADC, Tower=TB01c1 07TB01c1

Entries 1985 Mean 502.4

RMS 364.3

8 506 1004 1502 2000 0

5

10

15

20

25

ADC, Tower=TC01c1 07TC01c1

Entries 1643 Mean 378.8

RMS 221.3

8 506 1004 1502 2000 0

5

10

15

20

25

ADC, Tower=TD01c1 07TD01c1

Entries 1641 Mean 699.1

RMS 416.6

8 506 1004 1502 2000 0

5

10

15

20

25 ADC, Tower=TE01c1 07TE01c1

Entries 1549 Mean 417.1

RMS 233.6