8 506 1004 1502 2000 0

5

10

15

20

25

ADC, Tower=TA02c1 05TA02c1

Entries 1644 Mean 470.7

RMS 266.4

05TB02c1 Entries 1821

Mean 309 RMS 238 Underflow 0

8 506 1004 1502 2000 0 5 10 15 20 25 30 35 ADC, Tower=TB02c1

Mean 359.7 RMS 219.1

8 506 1004 1502 2000 0 5 10 15 20 25 30 35 40

ADC, Tower=TC02c1 05TC02c1

Entries 1531 Mean 246.2

RMS 131.2

8 506 1004 1502 2000 0

5

10

15

20

25

ADC, Tower=TD02c1 05TD02c1

Entries 1760 Mean 446.2

RMS 289.7

8 506 1004 1502 2000 0 2 4 6 8 10 12 14 16 18 20 22 ADC, Tower=TE02c1 05TE02c1

Entries 1683 Mean 452.4

RMS 286.7

8 506 1004 1502 2000 0

5

10

15

20

25

ADC, Tower=TA02c1 06TA02c1

Entries 1482 Mean 486.7

RMS 252.3

8 506 1004 1502 2000 0

5

10

15

20

25

30

ADC, Tower=TB02c1 06TB02c1

Entries 1616 Mean 381.9

RMS 217.9

8 506 1004 1502 2000 0

5

10

15

20

25

ADC, Tower=TC02c1 06TC02c1

Entries 1715 Mean 413.7

RMS 248.9

8 506 1004 1502 2000 0 2 4 6 8 10 12 14 16 18 20 22 24 ADC, Tower=TD02c1 06TD02c1

Entries 1703 Mean 493.6

RMS 319.8

8 506 1004 1502 2000 0

5

10

15

20

25

30

ADC, Tower=TE02c1 06TE02c1

Entries 1731 Mean 444.9

RMS 246.6

8 506 1004 1502 2000 0 2 4 6 8 10 12 14 16 18 20 22 24 ADC, Tower=TA02c1 07TA02c1

Entries 1679 Mean 719

RMS 581.6

8 506 1004 1502 2000 0

5

10

15

20

25

30

ADC, Tower=TB02c1 07TB02c1

Entries 1759 Mean 492

RMS 331.6

8 506 1004 1502 2000 0

5

10

15

20

25

30

35

ADC, Tower=TC02c1 07TC02c1

Entries 1581 Mean 310.9

RMS 179.1

8 506 1004 1502 2000 0

5

10

15

20

25

ADC, Tower=TD02c1 07TD02c1

Entries 1634 Mean 472.9

RMS 287.4

8 506 1004 1502 2000 0 2 4 6 8 10 12 14 16 18 20 22 24 ADC, Tower=TE02c1 07TE02c1

Entries 1544 Mean 434.9

RMS 240.3