8 506 1004 1502 2000 0

5

10

15

20

25

ADC, Tower=TA03c1 05TA03c1

Entries 1964 Mean 774.1

RMS 465.9

05TB03c1 Entries 1655

Mean 829.8 RMS 556.2 Underflow 0

8 506 1004 1502 2000 0 5 10 15 20 25 ADC, Tower=TB03c1

Mean 872.5 RMS 537

8 506 1004 1502 2000 0

5

10

15

20

25

30

ADC, Tower=TC03c1 05TC03c1

Entries 1601 Mean 332.4

RMS 185.6

8 506 1004 1502 2000 0

5

10

15

20

25

30

35

ADC, Tower=TD03c1 05TD03c1

Entries 1742 Mean 379.9

RMS 258.5

8 506 1004 1502 2000 0

5

10

15

20

25

30

ADC, Tower=TE03c1 05TE03c1

Entries 1693 Mean 384.8

RMS 250.8

8 506 1004 1502 2000 0

5 10 15 20 25 30 35 40

ADC, Tower=TA03c1 06TA03c1

Entries 1415 Mean 312.6

RMS 154.8

8 506 1004 1502 2000 0

5

10

15

20

25

ADC, Tower=TB03c1 06TB03c1

Entries 1685 Mean 449.5

RMS 271.1

8 506 1004 1502 2000 0 2 4 6 8 10 12 14 16

ADC, Tower=TC03c1 06TC03c1

Entries 1671 Mean 682.8

RMS 433.3

8 506 1004 1502 2000 0 2 4 6 8 10 12 14 16 18 20 22 24 ADC, Tower=TD03c1 06TD03c1

Entries 1643 Mean 455.6

RMS 282.1

8 506 1004 1502 2000 -1

-0.5

0

0.5

1

ADC, Tower=TE03c1 06TE03c1

Entries 261 Mean 0

RMS 0

8 506 1004 1502 2000 0

5

10

15

20

25

ADC, Tower=TA03c1 07TA03c1

Entries 1669 Mean 746.5

RMS 594.3

8 506 1004 1502 2000 0

5

10

15

20

25

30 ADC, Tower=TB03c1 07TB03c1

Entries 1682 Mean 435.4

RMS 275.5

8 506 1004 1502 2000 0 2 4 6 8 10 12 14 16 18 20 22 24 ADC, Tower=TC03c1 07TC03c1

Entries 1635 Mean 650.6

RMS 399.2

8 506 1004 1502 2000 0

5

10

15

20

25

30

ADC, Tower=TD03c1 07TD03c1

Entries 1676 Mean 447.1

RMS 275.5

8 506 1004 1502 2000 0

5

10

15

20

25 ADC, Tower=TE03c1 07TE03c1

Entries 1610 Mean 415.7

RMS 247.5