8 506 1004 1502 2000 0

5

10

15

20

25

ADC, Tower=TA04c1 05TA04c1

Entries 1759 Mean 525.2

RMS 562.4

05TB04c1 Entries 1645

Mean 1050 RMS 683 Underflow 0

8 506 1004 1502 2000 0 2 4 6 8 10 12 14 16 18 ADC, Tower=TB04c1

Mean 1081 RMS 668.4

8 506 1004 1502 2000 0

5

10

15

20

25

30

35

ADC, Tower=TC04c1 05TC04c1

Entries 1894 Mean 308.1

RMS 170.1

8 506 1004 1502 2000 -1

-0.5

0

0.5

1

ADC, Tower=TD04c1 05TD04c1

Entries 0 Mean 0

RMS 0

8 506 1004 1502 2000 0 2 4 6 8 10 12 14 16 18 20 22 24 ADC, Tower=TE04c1 05TE04c1

Entries 1666 Mean 553.8

RMS 348.1

8 506 1004 1502 2000 0

5

10

15

20

25

ADC, Tower=TA04c1 06TA04c1

Entries 1480 Mean 391.1

RMS 209.4

8 506 1004 1502 2000 -1

-0.5

0

0.5

1

ADC, Tower=TB04c1 06TB04c1

Entries 9 Mean 0

RMS 0

8 506 1004 1502 2000 0

5

10

15

20

25

ADC, Tower=TC04c1 06TC04c1

Entries 1751 Mean 397.7

RMS 242.2

8 506 1004 1502 2000 0

5

10

15

20

25

ADC, Tower=TD04c1 06TD04c1

Entries 1748 Mean 427.6

RMS 268.7

8 506 1004 1502 2000 0 2 4 6 8 10 12 14 16 18 20 22

ADC, Tower=TE04c1 06TE04c1

Entries 1680 Mean 468.6

RMS 254.9

8 506 1004 1502 2000 0

5

10

15

20

25

ADC, Tower=TA04c1 07TA04c1

Entries 1638 Mean 477.4

RMS 284.5

8 506 1004 1502 2000 0

5

10

15

20

25 ADC, Tower=TB04c1 07TB04c1

Entries 1684 Mean 445.5

RMS 278.8

8 506 1004 1502 2000 0 2 4 6 8 10 12 14 16

ADC, Tower=TC04c1 07TC04c1

Entries 1772 Mean 1020

RMS 652.6

8 506 1004 1502 2000 -1

-0.5

0

0.5

1

ADC, Tower=TD04c1 07TD04c1

Entries 8 Mean 0

RMS 0

8 506 1004 1502 2000 0 2 4 6 8 10 12 14 16 18 20 22 24 ADC, Tower=TE04c1 07TE04c1

Entries 1587 Mean 491.3

RMS 278.1