8 506 1004 1502 2000 0 2 4 6 8 10 12 14 16

ADC, Tower=TA05c1 05TA05c1

Entries 1721 Mean 801.1

RMS 528.1

05TB05c1 Entries 1729

Mean 460.2 RMS 315.9 Underflow 0

8 506 1004 1502 2000 0 2 4 6 8 10 12 14 16 18 20 22 ADC, Tower=TB05c1

Mean 487 RMS 304.4

8 506 1004 1502 2000 0

5

10

15

20

25

30

ADC, Tower=TC05c1 05TC05c1

Entries 1558 Mean 371

RMS 205.5

8 506 1004 1502 2000 0

10

20

30

40

50 ADC, Tower=TD05c1 05TD05c1

Entries 1758 Mean 278.6

RMS 185.8

8 506 1004 1502 2000 0

5

10

15

20

25

30

ADC, Tower=TE05c1 05TE05c1

Entries 1714 Mean 353.7

RMS 227.6

8 506 1004 1502 2000 0

5

10

15

20

25

ADC, Tower=TA05c1 06TA05c1

Entries 1471 Mean 360.3

RMS 189.5

8 506 1004 1502 2000 0

5

10

15

20

25

ADC, Tower=TB05c1 06TB05c1

Entries 1715 Mean 465.3

RMS 299

8 506 1004 1502 2000 0 2 4 6 8 10 12 14 16 18 20 22 ADC, Tower=TC05c1 06TC05c1

Entries 1694 Mean 493.9

RMS 305.2

8 506 1004 1502 2000 0

5

10

15

20

25

ADC, Tower=TD05c1 06TD05c1

Entries 1927 Mean 574.3

RMS 377.7

8 506 1004 1502 2000 0 2 4 6 8 10 12 14 16 18 20 22 24 ADC, Tower=TE05c1 06TE05c1

Entries 1646 Mean 499.2

RMS 284.2

8 506 1004 1502 2000 0

2

4

6

8

10

12

14

ADC, Tower=TA05c1 07TA05c1

Entries 1721 Mean 878.2

RMS 579.9

8 506 1004 1502 2000 0 2 4 6 8 10 12 14 16 18 20

ADC, Tower=TB05c1 07TB05c1

Entries 1723 Mean 611.1

RMS 392.2

8 506 1004 1502 2000 0 2 4 6 8 10 12 14 16 18 20 22

ADC, Tower=TC05c1 07TC05c1

Entries 1659 Mean 596.2

RMS 366.5

8 506 1004 1502 2000 0

5

10

15

20

25

30

ADC, Tower=TD05c1 07TD05c1

Entries 1649 Mean 534.3

RMS 331.5

8 506 1004 1502 2000 0

5

10

15

20

25

ADC, Tower=TE05c1 07TE05c1

Entries 1591 Mean 557.7

RMS 318.6