8 506 1004 1502 2000 0 5 10

15 20

25 30 35

40

ADC, Tower=TA06c1 05TA06c1

Entries 1639 Mean 292.1

RMS 177.6

05TB06c1 Entries 1568

Mean 119.8 RMS 71.02 Underflow 0

8 506 1004 1502 2000 0 10 20 30 40 50 60 70 80 90 ADC, Tower=TB06c1

Mean 124.2 RMS 68.84

8 506 1004 1502 2000 0

5

10

15

20

25

30

ADC, Tower=TC06c1 05TC06c1

Entries 1862 Mean 372.3

RMS 225.9

8 506 1004 1502 2000 0 2 4 6 8 10 12 14 16 18 20

ADC, Tower=TD06c1 05TD06c1

Entries 1860 Mean 974.6

RMS 712.4

8 506 1004 1502 2000 0 2 4 6 8 10 12 14 16 18 20 22

ADC, Tower=TE06c1 05TE06c1

Entries 1657 Mean 452.3

RMS 283.5

8 506 1004 1502 2000 0

5

10

15

20

25

30

ADC, Tower=TA06c1 06TA06c1

Entries 1459 Mean 385.9

RMS 202.2

8 506 1004 1502 2000 0

5

10

15

20

25

ADC, Tower=TB06c1 06TB06c1

Entries 1742 Mean 548.7

RMS 360.8

8 506 1004 1502 2000 0 2 4 6 8 10 12 14 16 18 20 22 24 ADC, Tower=TC06c1 06TC06c1

Entries 1772 Mean 490.3

RMS 319.9

8 506 1004 1502 2000 0 2 4 6 8 10 12 14 16 18 20 22 24 ADC, Tower=TD06c1 06TD06c1

Entries 1783 Mean 456.5

RMS 290

8 506 1004 1502 2000 0

5

10

15

20

25 ADC, Tower=TE06c1 06TE06c1

Entries 1633 Mean 493.3

RMS 295

8 506 1004 1502 2000 0

2

4

6

8

10

12

14

ADC, Tower=TA06c1 07TA06c1

Entries 1712 Mean 719.2

RMS 580.9

8 506 1004 1502 2000 0 2 4 6 8 10 12 14 16 18

ADC, Tower=TB06c1 07TB06c1

Entries 1800 Mean 830.9

RMS 567.5

8 506 1004 1502 2000 0 2 4 6 8 10 12 14 16 18 20

ADC, Tower=TC06c1 07TC06c1

Entries 1677 Mean 534.8

RMS 330.8

8 506 1004 1502 2000 0 2 4 6 8 10 12 14 16 18 20 22 ADC, Tower=TD06c1 07TD06c1

Entries 1628 Mean 640.9

RMS 390

8 506 1004 1502 2000 -1

-0.5

0

0.5

1

ADC, Tower=TE06c1 07TE06c1

Entries 0 Mean 0

RMS 0