8 506 1004 1502 2000 0 2 4 6 8 10 12 14 16 18

ADC, Tower=TA07c1 05TA07c1

Entries 1698 Mean 602.9

RMS 384.3

05TB07c1 Entries 1985

Mean 602.8 RMS 630.6 Underflow 0

8 506 1004 1502 2000 0 5 10 15 20 25 ADC, Tower=TB07c1

Mean 756.8 RMS 619.7

8 506 1004 1502 2000 0

5

10

15

20

25 ADC, Tower=TC07c1 05TC07c1

Entries 2029 Mean 452.7

RMS 280.9

8 506 1004 1502 2000 0

10 20

30 40 50

60 70

80

ADC, Tower=TD07c1 05TD07c1

Entries 1710 Mean 122.2

RMS 74.65

8 506 1004 1502 2000 0 5 10 15 20 25 30 35 40 45

ADC, Tower=TE07c1 05TE07c1

Entries 1720 Mean 290.3

RMS 187.3

8 506 1004 1502 2000 0 2 4 6 8 10 12 14 16 18 20 22 ADC, Tower=TA07c1 06TA07c1

Entries 1522 Mean 541.5

RMS 309.9

8 506 1004 1502 2000 0 2 4 6 8 10 12 14 16 18 20 22 24 ADC, Tower=TB07c1 06TB07c1

Entries 1710 Mean 475.5

RMS 306

8 506 1004 1502 2000 -1

-0.5

0

0.5

1

ADC, Tower=TC07c1 06TC07c1

Entries 41 Mean 0

RMS 0

8 506 1004 1502 2000 0 2 4 6 8 10 12 14 16 18 20 22 ADC, Tower=TD07c1 06TD07c1

Entries 1761 Mean 583.4

RMS 380.7

8 506 1004 1502 2000 0 2 4 6 8 10 12 14 16 18 20

ADC, Tower=TE07c1 06TE07c1

Entries 1565 Mean 525.5

RMS 304.5

8 506 1004 1502 2000 0

2

4

6

8

10

12

14

ADC, Tower=TA07c1 07TA07c1

Entries 1790 Mean 685.8

RMS 592.2

8 506 1004 1502 2000 0 2 4 6 8 10 12 14 16 18 20

ADC, Tower=TB07c1 07TB07c1

Entries 1768 Mean 545

RMS 361.9

8 506 1004 1502 2000 0 2 4 6 8 10 12 14 16 18 20 22 ADC, Tower=TC07c1 07TC07c1

Entries 1794 Mean 572.6

RMS 378.2

8 506 1004 1502 2000 0 2 4 6 8 10 12 14 16 18

ADC, Tower=TD07c1 07TD07c1

Entries 1662 Mean 597.3

RMS 373.4

8 506 1004 1502 2000 0 2 4 6 8 10 12 14 16 18 20 22 ADC, Tower=TE07c1 07TE07c1

Entries 1642 Mean 564.2

RMS 343