8 506 1004 1502 2000 0

10

20

30

40

50

ADC, Tower=TA08c1 05TA08c1

Entries 1672 Mean 192.6

RMS 111.9

05TB08c1 Entries 1787

Mean 374 RMS 270.7 Underflow 0

8 506 1004 1502 2000 0 5 10 15 20 25 30 ADC, Tower=TB08c1

Mean 397.2 RMS 262.1

8 506 1004 1502 2000 0

5

10

15

20

25 ADC, Tower=TC08c1 05TC08c1

Entries 1705 Mean 505.9

RMS 318.8

8 506 1004 1502 2000 0

5

10 15

20

25

30 35

ADC, Tower=TD08c1 05TD08c1

Entries 1900 Mean 408.7

RMS 291.6

8 506 1004 1502 2000 0

5

10

15

20

25

ADC, Tower=TE08c1 05TE08c1

Entries 1893 Mean 487.2

RMS 341

8 506 1004 1502 2000 0

5

10

15

20

25 ADC, Tower=TA08c1 06TA08c1

Entries 1546 Mean 467.8

RMS 260

8 506 1004 1502 2000 0

5

10

15

20

25

30

ADC, Tower=TB08c1 06TB08c1

Entries 1698 Mean 424.7

RMS 269.2

8 506 1004 1502 2000 0 2 4 6 8 10 12 14 16 18 20

ADC, Tower=TC08c1 06TC08c1

Entries 1781 Mean 616.6

RMS 411.1

8 506 1004 1502 2000 0 2 4 6 8 10 12 14 16 18 20 22 ADC, Tower=TD08c1 06TD08c1

Entries 1816 Mean 591.3

RMS 408.6

8 506 1004 1502 2000 0 2 4 6 8 10 12 14 16 18

ADC, Tower=TE08c1 06TE08c1

Entries 1739 Mean 568

RMS 347.1

8 506 1004 1502 2000 0

2

4

6

8

10

12

ADC, Tower=TA08c1 07TA08c1

Entries 1780 Mean 678.8

RMS 596.6

8 506 1004 1502 2000 0

5

10

15

20

25 ADC, Tower=TB08c1 07TB08c1

Entries 1734 Mean 634.8

RMS 417.3

8 506 1004 1502 2000 0

5

10

15

20

25 ADC, Tower=TC08c1 07TC08c1

Entries 1841 Mean 833.6

RMS 598.7

8 506 1004 1502 2000 -1

-0.5

0

0.5

1

ADC, Tower=TD08c1 07TD08c1

Entries 104 Mean 0

RMS 0

8 506 1004 1502 2000 0 2 4 6 8 10 12 14 16 18

ADC, Tower=TE08c1 07TE08c1

Entries 1656 Mean 626.6

RMS 385.1