8 506 1004 1502 2000 0

20

40

60

80

100

ADC, Tower=TA09c1 05TA09c1

Entries 1630 Mean 90.77

RMS 49.78

05TB09c1 Entries 1677

Mean 213.8 RMS 138.3 Underflow 0

8 506 1004 1502 2000 0 5 10 15 20 25 30 35 40 ADC, Tower=TB09c1

Mean 220.3 RMS 135.2

8 506 1004 1502 2000 0 2 4 6 8 10 12 14 16 18 20 22 24 ADC, Tower=TC09c1 05TC09c1

Entries 1725 Mean 456.4

RMS 283.5

8 506 1004 1502 2000 0

10

20

30

40

50

ADC, Tower=TD09c1 05TD09c1

Entries 1901 Mean 351.8

RMS 254.2

8 506 1004 1502 2000 0

10

20

30

40

50

ADC, Tower=TE09c1 05TE09c1

Entries 1702 Mean 168.5

RMS 106.1

8 506 1004 1502 2000 0

5

10

15

20

25

ADC, Tower=TA09c1 06TA09c1

Entries 1567 Mean 474.6

RMS 257.2

8 506 1004 1502 2000 0

10

20

30

40

50

60

ADC, Tower=TB09c1 06TB09c1

Entries 1718 Mean 172.5

RMS 106.8

8 506 1004 1502 2000 0

5

10

15

20

25

ADC, Tower=TC09c1 06TC09c1

Entries 1779 Mean 531.2

RMS 350.5

8 506 1004 1502 2000 0

5

10

15

20

25

ADC, Tower=TD09c1 06TD09c1

Entries 1787 Mean 494.4

RMS 332.3

8 506 1004 1502 2000 0 2 4 6 8 10 12 14 16 18

ADC, Tower=TE09c1 06TE09c1

Entries 1673 Mean 584.9

RMS 361.2

8 506 1004 1502 2000 0

2

4

6

8

10

12

14

ADC, Tower=TA09c1 07TA09c1

Entries 1923 Mean 676.7

RMS 594.3

8 506 1004 1502 2000 0 2 4 6 8 10 12 14 16 18 20 22 24 ADC, Tower=TB09c1 07TB09c1

Entries 1809 Mean 603.6

RMS 405.1

8 506 1004 1502 2000 0 2 4 6 8 10 12 14 16 18 20 22

ADC, Tower=TC09c1 07TC09c1

Entries 1738 Mean 607.6

RMS 392.6

8 506 1004 1502 2000 0 2 4 6 8 10 12 14 16 18

ADC, Tower=TD09c1 07TD09c1

Entries 1751 Mean 612.6

RMS 403.6

8 506 1004 1502 2000 0 2 4 6 8 10 12 14 16 18

ADC, Tower=TE09c1 07TE09c1

Entries 1741 Mean 687.7

RMS 464.4