8 506 1004 1502 2000 0

5

10

15

20

25

30

ADC, Tower=TA10c1 05TA10c1

Entries 1715 Mean 276.4

RMS 171.2

05TB10c1 Entries 1710

Mean 139.4 RMS 91.93 Underflow 0

8 506 1004 1502 2000 0 10 20 30 40 50 60 70 ADC, Tower=TB10c1

Mean 146.9 RMS 88.5

8 506 1004 1502 2000 0

5

10

15

20

25

ADC, Tower=TC10c1 05TC10c1

Entries 1918 Mean 375.4

RMS 235

8 506 1004 1502 2000 0

0.2

0.4

0.6

0.8

1

ADC, Tower=TD10c1 05TD10c1

Entries 164 Mean 10

RMS -0

8 506 1004 1502 2000 0 10 20 30 40 50 60 70 80

ADC, Tower=TE10c1 05TE10c1

Entries 1653 Mean 94.4

RMS 54.03

8 506 1004 1502 2000 0

5

10

15

20

25

ADC, Tower=TA10c1 06TA10c1

Entries 1616 Mean 432.6

RMS 247.5

8 506 1004 1502 2000 0

5

10

15

20

25

30

ADC, Tower=TB10c1 06TB10c1

Entries 1856 Mean 509.5

RMS 351.9

8 506 1004 1502 2000 0 5 10 15 20 25 30 35 40

ADC, Tower=TC10c1 06TC10c1

Entries 1812 Mean 305

RMS 207.9

8 506 1004 1502 2000 -1

-0.5

0

0.5

1

ADC, Tower=TD10c1 06TD10c1

Entries 628 Mean 0

RMS 0

8 506 1004 1502 2000 0

5

10

15

20

25

ADC, Tower=TE10c1 06TE10c1

Entries 1641 Mean 404.1

RMS 245.7

8 506 1004 1502 2000 0 2

4 6 8 10 12 14 16

ADC, Tower=TA10c1 07TA10c1

Entries 1839 Mean 688.3

RMS 618.2

8 506 1004 1502 2000 0 2 4 6 8 10 12 14 16 18 20

ADC, Tower=TB10c1 07TB10c1

Entries 1761 Mean 607.9

RMS 410.7

8 506 1004 1502 2000 0 2 4 6 8 10 12 14 16 18

ADC, Tower=TC10c1 07TC10c1

Entries 1761 Mean 629.9

RMS 425.2

8 506 1004 1502 2000 0 2 4 6 8 10 12 14 16 18

ADC, Tower=TD10c1 07TD10c1

Entries 1740 Mean 690.2

RMS 452.1

8 506 1004 1502 2000 0 2 4 6 8 10 12 14 16 18 20

ADC, Tower=TE10c1 07TE10c1

Entries 1754 Mean 742.6

RMS 493.7