8 506 1004 1502 2000 0

5

10

15

20

25

ADC, Tower=TA11c1 05TA11c1

Entries 1729 Mean 367

RMS 224.1

05TB11c1 Entries 1837

Mean 409.9 RMS 299.7 Underflow 0

8 506 1004 1502 2000 0 5 10 15 20 25 30 ADC, Tower=TB11c1

Mean 422.2 RMS 295.6

8 506 1004 1502 2000 0

5

10

15

20

25

30

ADC, Tower=TC11c1 05TC11c1

Entries 1652 Mean 339.8

RMS 204.7

8 506 1004 1502 2000 0

10

20

30

40

50

60

ADC, Tower=TD11c1 05TD11c1

Entries 1899 Mean 318

RMS 225.7

8 506 1004 1502 2000 0

10

20

30

40

50

ADC, Tower=TE11c1 05TE11c1

Entries 1837 Mean 293.6

RMS 203.3

8 506 1004 1502 2000 0

5

10

15

20

25

30

ADC, Tower=TA11c1 06TA11c1

Entries 1649 Mean 409.2

RMS 247.3

8 506 1004 1502 2000 0

5

10

15

20

25

30

ADC, Tower=TB11c1 06TB11c1

Entries 1861 Mean 516.2

RMS 355

8 506 1004 1502 2000 0

5

10

15

20

25

30

35

ADC, Tower=TC11c1 06TC11c1

Entries 1824 Mean 533.8

RMS 372.5

8 506 1004 1502 2000 0

5

10

15

20

25

30

ADC, Tower=TD11c1 06TD11c1

Entries 1839 Mean 576.6

RMS 402.7

8 506 1004 1502 2000 0 2 4 6 8 10 12 14 16 18

ADC, Tower=TE11c1 06TE11c1

Entries 1757 Mean 687.7

RMS 449.7

8 506 1004 1502 2000 0 2 4 6 8 10 12 14 16 18 20 22 24 ADC, Tower=TA11c1 07TA11c1

Entries 1832 Mean 803.6

RMS 667.8

8 506 1004 1502 2000 0

5

10

15

20

25 ADC, Tower=TB11c1 07TB11c1

Entries 1808 Mean 644.6

RMS 446.9

8 506 1004 1502 2000 0 2 4 6 8 10 12 14 16 18 20

ADC, Tower=TC11c1 07TC11c1

Entries 1747 Mean 648.8

RMS 435.4

8 506 1004 1502 2000 0

5

10

15

20

25

ADC, Tower=TD11c1 07TD11c1

Entries 1799 Mean 599.6

RMS 415.5

8 506 1004 1502 2000 0 2 4 6 8 10 12 14 16 18 20 22 ADC, Tower=TE11c1 07TE11c1

Entries 1755 Mean 632.4

RMS 420.2