8 506 1004 1502 2000 0 2 4 6 8 10 12 14 16 18 20 22 24 ADC, Tower=TA12c1 05TA12c1

Entries 1853 Mean 565.7

RMS 380.4

05TB12c1 Entries 1858

Mean 486.2 RMS 352.7 Underflow 0

8 506 1004 1502 2000 0 5 10 15 20 25 30 ADC, Tower=TB12c1

Mean 498.6 RMS 348.5

8 506 1004 1502 2000 0

0.2

0.4

0.6

0.8

1

ADC, Tower=TC12c1 05TC12c1

Entries 1714 Mean 10

RMS -0

8 506 1004 1502 2000 0

5

10

15

20

25

30

ADC, Tower=TD12c1 05TD12c1

Entries 2014 Mean 675.2

RMS 655.1

8 506 1004 1502 2000 0

10

20

30

40

50

ADC, Tower=TE12c1 05TE12c1

Entries 1908 Mean 470.1

RMS 348.5

8 506 1004 1502 2000 -1

-0.5

0

0.5

1

ADC, Tower=TA12c1 06TA12c1

Entries 35 Mean 0

RMS 0

8 506 1004 1502 2000 0

5

10

15

20

25

ADC, Tower=TB12c1 06TB12c1

Entries 1870 Mean 712.5

RMS 499.8

8 506 1004 1502 2000 0 2 4 6 8 10 12 14 16 18 20

ADC, Tower=TC12c1 06TC12c1

Entries 1836 Mean 750.4

RMS 525.7

8 506 1004 1502 2000 -1

-0.5

0

0.5

1

ADC, Tower=TD12c1 06TD12c1

Entries 312 Mean 0

RMS 0

8 506 1004 1502 2000 0 2 4 6 8 10 12 14 16 18 20

ADC, Tower=TE12c1 06TE12c1

Entries 1814 Mean 971.3

RMS 667.9

8 506 1004 1502 2000 0 2 4 6 8 10 12 14 16 18 20 22 ADC, Tower=TA12c1 07TA12c1

Entries 1764 Mean 589.6

RMS 387

8 506 1004 1502 2000 0 2 4 6 8 10 12 14 16 18 20 22

ADC, Tower=TB12c1 07TB12c1

Entries 1885 Mean 904.4

RMS 651.5

8 506 1004 1502 2000 0 2 4 6 8 10 12 14 16 18 20

ADC, Tower=TC12c1 07TC12c1

Entries 1845 Mean 956.1

RMS 692.3

8 506 1004 1502 2000 0 2 4 6 8 10 12 14 16 18

ADC, Tower=TD12c1 07TD12c1

Entries 1873 Mean 975

RMS 710.1

8 506 1004 1502 2000 0 2 4 6 8 10 12 14 16

ADC, Tower=TE12c1 07TE12c1

Entries 1777 Mean 908.6

RMS 618.3