bins η invariant mass in γγ→ ^0π

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

/ ndf

2χ 4.484 / 5 Constant 2.046 ± 9.343 Mean 0.006631 ± 0.1679 Sigma 0.007665 ± 0.03874

0 2 4 6 8 10 12 ± ± ±

(real) for eta bin 1 γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

/ ndf

2χ 10.7 / 6 Constant 1.203 ± 4.021 Mean 0.03291 ± 0.2013 Sigma 0.04005 ± 0.06753

0 1 2 3 4 5 6 7 8 9 ± ± ±

(real) for eta bin 2 γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

/ ndf

2χ 4.451 / 3 Constant 2.14±

6.812 Mean 0.03119 ± 0.1775 Sigma 0.05983 ± 0.06097

0 1 2 3 4 5 6 7 8 9 ± ±

(real) for eta bin 3 γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

/ ndf

2χ 8.91 / 4 Constant 3.69±

12.65 Mean 0.004599 ± 0.1892 Sigma 0.005431 ± 0.02172

0 2 4 6 8 10 12 14 16 ± ±

(real) for eta bin 4 γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

/ ndf

2χ 1.964 / 4 Constant 2.131 ± 3.803 Mean 0.1777 ± 0.2549 Sigma 0.1052 ± 0.0984

0

1

2

3

4

5 ± ± ±

(real) for eta bin 5 γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

/ ndf

2χ 3.047 / 5 Constant 1.064 ± 2.188 Mean 0.03955 ± 0.2009 Sigma 0.05675 ± 0.05906

0 0.5 1 1.5 2 2.5 3 3.5 4 ± ± ±

(real) for eta bin 6 γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

/ ndf

2χ 0.1736 / 1 Constant 2.089 ± 5.606 Mean 0.01363 ± 0.1618 Sigma 0.008824 ± 0.03813

0

1

2

3

4

5 ± ± ±

(real) for eta bin 7 γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

/ ndf

2χ 0.3167 / 2 Constant 1.347 ± 3.989 Mean 0.01281 ± 0.19 Sigma 0.011 ± 0.03538

0

1

2

3

4

5 ± ± ±

(real) for eta bin 8 γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

/ ndf

2χ 4.716e-17 / -1 Constant 21.84 ± 2.761 Mean 0.01549 ± 0.19 Sigma 0.1737 ± 0.0249

0 0.5 1 1.5 2 2.5 3 ± ± ±

(real) for eta bin 9 γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

/ ndf

2χ 4.249e-11 / 0 Constant 9.585 ± 8.724 Mean 0.008158 ± 0.14 Sigma 0.008342 ± 0.02402

0 0.5 1 1.5 2 2.5 3 3.5 4 ± ± ±

(real) for eta bin 10 γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

/ ndf

2χ 3.894e-12 / -1 Constant 15.11 ± 1.351 Mean 0.03526 ± 0.22 Sigma 0.1686 ± 0.0387

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2 2.2 ± ± ±

(real) for eta bin 11 γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

/ ndf

2χ 0.1473 / 1 Constant 1.238 ± 2.051 Mean 0.1369 ± 0.225 Sigma 0.1731 ± 0.05633

0 0.5 1 1.5 2 2.5 3 3.5 4 ± ± ±

(real) for eta bin 12 γγM

Wed Jul 9 09:46:38 2003