bins η invariant mass in γγ→ ^0π

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

/ ndf

2χ 6.089 / 4 Constant 5.496 ± 39.56 Mean 0.001996 ± 0.1323 Sigma 0.001858 ± 0.01955

0 5 10 15 20 25 30 35 40 45 ± ± ±

(real) for eta bin 1 γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

/ ndf

2χ 7.192 / 5 Constant 4.823 ± 40.07 Mean 0.002408 ± 0.1342 Sigma 0.002427 ± 0.02754

0

10

20

30

40

50 ± ± ±

(real) for eta bin 2 γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

/ ndf

2χ 8.013 / 5 Constant 4.06±

35.12 Mean 0.002891 ± 0.1271 Sigma 0.00203 ± 0.0272

0 5 10 15 20 25 30 35 ± ±

(real) for eta bin 3 γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

/ ndf

2χ 7.801 / 6 Constant 5.702 ± 48.55 Mean 0.002035 ± 0.1373 Sigma 0.002124 ± 0.02487

0

10

20

30

40

50 ± ± ±

(real) for eta bin 4 γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

/ ndf

2χ 5.918 / 5 Constant 5.046 ± 52.76 Mean 0.002048 ± 0.1347 Sigma 0.001613 ± 0.0267

0 10 20

30 40 50 60 ± ± ±

(real) for eta bin 5 γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

/ ndf

2χ 6.151 / 5 Constant 6.373 ± 74.02 Mean 0.001609 ± 0.1405 Sigma 0.001277 ± 0.02371

0 10 20 30 40 50 60 70 80 ± ± ±

(real) for eta bin 6 γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

/ ndf

2χ 4.228 / 7 Constant 5.554 ± 60.92 Mean 0.001913 ± 0.142 Sigma 0.001488 ± 0.02592

0

10 20

30 40

50 60 ± ± ±

(real) for eta bin 7 γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

/ ndf

2χ 5.038 / 6 Constant 6.141 ± 65.3 Mean 0.001767 ± 0.1401 Sigma 0.001366 ± 0.02297

0 10 20 30 40 50 60 ± ± ±

(real) for eta bin 8 γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

/ ndf

2χ 25.11 / 6 Constant 7.992 ± 65.34 Mean 0.002223 ± 0.1333 Sigma 0.001668 ± 0.0183

0 10 20 30 40 50 60 70 ± ± ±

(real) for eta bin 9 γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

/ ndf

2χ 13.03 / 6 Constant 5.216 ± 45.16 Mean 0.002452 ± 0.1383 Sigma 0.001858 ± 0.02362

0 5 10 15 20 25 30 35 40 45 ± ± ±

(real) for eta bin 10 γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

/ ndf

2χ 13.18 / 7 Constant 4.705 ± 36.47 Mean 0.002983 ± 0.1347 Sigma 0.002356 ± 0.02581

0 5 10 15 20 25 30 35 ± ± ±

(real) for eta bin 11 γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

/ ndf

2χ 4.776 / 5 Constant 3.593 ± 28.29 Mean 0.003243 ± 0.1403 Sigma 0.002415 ± 0.02897

0 5 10 15 20 25 30 35 ± ± ±

(real) for eta bin 12 γγM

Wed Jul 9 09:44:23 2003