bins η invariant mass in γγ→ ^0π

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

/ ndf

2χ 7.297 / 7 Constant 6.084 ± 85.31 Mean 0.001973 ± 0.1184 Sigma 0.001808 ± 0.03284

0 10 20 30 40 50 60 70 80 90 ± ± ±

(real) for eta bin 1 γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

/ ndf

2χ 9.608 / 6 Constant 7.764 ± 111.2 Mean 0.001496 ± 0.1235 Sigma 0.00146 ± 0.02833

0

20 40

60 80

100 120 ± ± ±

(real) for eta bin 2 γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

/ ndf

2χ 10.4 / 7 Constant 9.025 ± 164.1 Mean 0.001214 ± 0.1259 Sigma 0.001022 ± 0.02756

0 20 40 60 80 100 120 140 160 ± ± ±

(real) for eta bin 3 γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

/ ndf 2 χ 30.45 / 7

Constant 10.33±

193.5 Mean 0.001078 ± 0.1329 Sigma 0.0009026 ± 0.02542

0 20 40 60 80 100 120 140 160 180 200 2

± ±

(real) for eta bin 4 γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

/ ndf

2χ 14.79 / 7 Constant 9.363 ± 149.4 Mean 0.001178 ± 0.1382 Sigma 0.001058 ± 0.02491

0 20 40 60 80 100 120 140 160 ± ± ±

(real) for eta bin 5 γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

/ ndf

2χ 11.74 / 7 Constant 8.656 ± 145.6 Mean 0.001272 ± 0.1387 Sigma 0.001088 ± 0.0274

0 20 40 60 80 100 120 140 160 ± ± ±

(real) for eta bin 6 γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

/ ndf

2χ 13.45 / 7 Constant 7.952 ± 122 Mean 0.00144 ± 0.142 Sigma 0.001143 ± 0.02674

0 20 40 60 80 100 120 140 ± ± ±

(real) for eta bin 7 γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

/ ndf

2χ 21.4 / 6 Constant 8.157 ± 114.8 Mean 0.001546 ± 0.1414 Sigma 0.00136 ± 0.02647

0

20

40

60

80

100

120 ± ± ±

(real) for eta bin 8 γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

/ ndf

2χ 12.05 / 7 Constant 6.723 ± 90.6 Mean 0.001819 ± 0.147 Sigma 0.00144 ± 0.02882

0

20

40

60

80

100 ± ± ±

(real) for eta bin 9 γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

/ ndf

2χ 19.6 / 6 Constant 6.385 ± 94.07 Mean 0.001759 ± 0.1449 Sigma 0.001129 ± 0.02806

0

20

40

60

80

100 ± ± ±

(real) for eta bin 10 γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

/ ndf

2χ 11.64 / 6 Constant 4.453 ± 33.85 Mean 0.003425 ± 0.1474 Sigma 0.004276 ± 0.03633

0 5 10 15 20 25 30 35 40 ± ± ±

(real) for eta bin 11 γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

/ ndf

2χ 11.41 / 6 Constant 4.301 ± 37.6 Mean 0.003154 ± 0.1386 Sigma 0.003623 ± 0.03583

0 5 10 15 20 25 30 35 40 45 ± ± ±

(real) for eta bin 12 γγM

Wed Jul 9 09:44:55 2003