bins η invariant mass in γγ→ ^0π

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

/ ndf

2χ 6.626 / 5 Constant 6.969 ± 88.91 Mean 0.001603 ± 0.1366 Sigma 0.001412 ± 0.02638

0

20

40

60

80

100 ± ± ±

(real) for eta bin 1 γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

/ ndf

2χ 7.126 / 6 Constant 7.428 ± 94.66 Mean 0.001461 ± 0.1534 Sigma 0.001341 ± 0.0252

0

20

40

60

80

100 ± ± ±

(real) for eta bin 2 γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

/ ndf

2χ 7.74 / 7 Constant 7.093 ± 108.8 Mean 0.001518 ± 0.1545 Sigma 0.00129 ± 0.03005

0 20

40 60

80 100 120 ± ± ±

(real) for eta bin 3 γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

/ ndf

2χ 8.008 / 7 Constant 6.199 ± 82.42 Mean 0.001795 ± 0.1545 Sigma 0.001486 ± 0.02994

0 10 20 30 40 50 60 70 80 90 ± ± ±

(real) for eta bin 4 γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

/ ndf

2χ 17.28 / 7 Constant 5.335 ± 63.76 Mean 0.002258 ± 0.1608 Sigma 0.001878 ± 0.03269

0 10 20 30 40 50 60 70 80 ± ± ±

(real) for eta bin 5 γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

/ ndf

2χ 25.14 / 6 Constant 5.128 ± 53.92 Mean 0.002427 ± 0.1624 Sigma 0.002566 ± 0.03466

0 10 20 30 40 50 60 70 80 90 ± ± ±

(real) for eta bin 6 γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

/ ndf

2χ 10.48 / 6 Constant 4.747 ± 39.34 Mean 0.002562 ± 0.1631 Sigma 0.00288 ± 0.03105

0 5 10 15 20 25 30 35 40 45 ± ± ±

(real) for eta bin 7 γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

/ ndf

2χ 4.565 / 6 Constant 5.202 ± 51.91 Mean 0.002087 ± 0.1653 Sigma 0.001723 ± 0.02637

0

10

20 30

40

50

60 ± ± ±

(real) for eta bin 8 γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

/ ndf

2χ 6.73 / 6 Constant 3.798 ± 34.16 Mean 0.002642 ± 0.1626 Sigma 0.001918 ± 0.02885

0 5 10 15 20 25 30 35 ± ± ±

(real) for eta bin 9 γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

/ ndf

2χ 12.96 / 5 Constant 4.749 ± 43.98 Mean 0.002202 ± 0.1601 Sigma 0.001567 ± 0.02389

0 5 10 15 20 25 30 35 40 45 ± ± ±

(real) for eta bin 10 γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

/ ndf

2χ 5.837 / 6 Constant 2.79±

14.32 Mean 0.00513 ± 0.1677 Sigma 0.005221 ± 0.03376

0 2 4 6 8 10 12 14 16 18 ± ±

(real) for eta bin 11 γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

/ ndf

2χ 9.812 / 6 Constant 3.495 ± 17.45 Mean 0.003943 ± 0.162 Sigma 0.004896 ± 0.02929

0 2 4 6 8 10 12 14 16 18 20 22 ± ± ±

(real) for eta bin 12 γγM

Wed Jul 9 09:45:40 2003