bins η invariant mass in γγ→ ^0π

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

/ ndf

2χ 8.658 / 6 Constant 3.084 ± 22.94 Mean 0.00386 ± 0.1471 Sigma 0.003078 ± 0.03337

0

5

10

15

20

25

30 ± ± ±

(real) for eta bin 1 γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

/ ndf

2χ 7.208 / 4 Constant 4.659 ± 24.61 Mean 0.004193 ± 0.1631 Sigma 0.006928 ± 0.03182

0

5

10

15

20

25

± ± ±

(real) for eta bin 2 γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

/ ndf

2χ 6.757 / 6 Constant 3.471 ± 22.89 Mean 0.004047 ± 0.175 Sigma 0.003895 ± 0.03305

0

5

10

15

20

25 ± ± ±

(real) for eta bin 3 γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

/ ndf

2χ 8.76 / 5 Constant 2.531 ± 18.18 Mean 0.005942 ± 0.1932 Sigma 0.004453 ± 0.03829

0

5

10

15

20

25 ± ± ±

(real) for eta bin 4 γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

/ ndf

2χ 1.588 / 4 Constant 2.292 ± 12.69 Mean 0.008839 ± 0.1822 Sigma 0.0133 ± 0.0499

0 2 4 6 8 10 12 14 ± ± ±

(real) for eta bin 5 γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

/ ndf

2χ 4.276 / 7 Constant 1.954 ± 10.84 Mean 0.008299 ± 0.1923 Sigma 0.007033 ± 0.04266

0 2 4 6 8 10 12 ± ± ±

(real) for eta bin 6 γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

/ ndf

2χ 6.837 / 5 Constant 1.792 ± 7.88 Mean 0.008522 ± 0.1913 Sigma 0.00769 ± 0.03765

0

2

4

6

8

10

12 ± ± ±

(real) for eta bin 7 γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

/ ndf

2χ 5.977 / 6 Constant 2.638 ± 11.21 Mean 0.004707 ± 0.1757 Sigma 0.005467 ± 0.02999

0

2

4

6

8

10

12 ± ± ±

(real) for eta bin 8 γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

/ ndf

2χ 0.8423 / 3 Constant 1.212 ± 4.067 Mean 0.02938 ± 0.2 Sigma 0.04089 ± 0.06625

0

1

2

3

4

5 ± ± ±

(real) for eta bin 9 γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

/ ndf

2χ 4.807 / 5 Constant 2.278 ± 6.873 Mean 0.006221 ± 0.1773 Sigma 0.007148 ± 0.0261

0 1 2 3 4 5 6 7 8 ± ± ±

(real) for eta bin 10 γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

/ ndf

2χ 0.6866 / 3 Constant 1.127 ± 2.544 Mean 0.05219 ± 0.1525 Sigma 0.06503 ± 0.05492

0 0.5 1 1.5 2 2.5 3 3.5 4 ± ± ±

(real) for eta bin 11 γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

/ ndf

2χ 1.354 / 3 Constant 1.118 ± 2.372 Mean 0.01511 ± 0.1889 Sigma 0.02±

0.03654

0 0.5 1 1.5 2 2.5 3 3.5 4 ± ± (real) for eta bin 12 γγM

Wed Jul 9 09:45:59 2003