bins η invariant mass in γγ→ ^0π

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

/ ndf

2χ 6.355 / 3 Constant 3.999 ± 12.38 Mean 0.004512 ± 0.1366 Sigma 0.006231 ± 0.02178

0 2 4 6 8 10 12 14 ± ± ±

(real) for eta bin 0 γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

/ ndf

2χ 5.087 / 3 Constant 2.665 ± 10.41 Mean 0.004535 ± 0.1338 Sigma 0.004138 ± 0.02169

0

2

4

6

8

10

12 ± ± ±

(real) for eta bin 1 γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

/ ndf

2χ 6.479 / 4 Constant 2.565 ± 11.14 Mean 0.005719 ± 0.1402 Sigma 0.004495 ± 0.02645

0 2 4 6 8 10 12 14 16 ± ± ±

(real) for eta bin 2 γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

/ ndf

2χ 1.372 / 3 Constant 1.748 ± 7.099 Mean 0.01095 ± 0.1376 Sigma 0.01027 ± 0.03835

0 1 2 3 4 5 6 7 8 ± ± ±

(real) for eta bin 3 γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

/ ndf

2χ 1.901 / 4 Constant 2.097 ± 8.23 Mean 0.005263 ± 0.1401 Sigma 0.004419 ± 0.02552

0

2

4

6

8

10 ± ± ±

(real) for eta bin 4 γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

/ ndf

2χ 4.508 / 2 Constant 2.786 ± 9.621 Mean 0.006322 ± 0.1446 Sigma 0.0044 ± 0.0183

0 2 4 6 8 10 12 ± ± ±

(real) for eta bin 5 γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

/ ndf

2χ 0.9115 / 2 Constant 2.289 ± 5.997 Mean 0.00474 ± 0.1598 Sigma 0.004191 ± 0.01615

0

1

2

3

4

5 ± ± ±

(real) for eta bin 6 γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

/ ndf

2χ 0.07719 / 2 Constant 2.397 ± 5.152 Mean 0.06396 ± 0.1724 Sigma 0.03762 ± 0.04495

0

1

2

3

4

5 ± ± ±

(real) for eta bin 7 γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

/ ndf

2χ 4.994e-12 / -1 Constant 14.33 ± 2.292 Mean 0.1576 ± 0.1385 Sigma 0.1726 ± 0.02211

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2 2.2 ± ± ±

(real) for eta bin 8 γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

/ ndf

2χ 7.547e-13 / 0 Constant 2.001 ± 4 Mean 0.005101 ± 0.17 Sigma 0.003746 ± 0.01201

0 0.5 1 1.5 2 2.5 3 3.5 4 ± 4 ± ±

(real) for eta bin 9 γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

/ ndf

2χ 6.562e-11 / -1 Constant 18.2±

2.484 Mean 0.05686 ± 0.1634 Sigma 0.07899 ± 0.009961

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2 2.2 ± ±

(real) for eta bin 10 γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

/ ndf

2χ 1.617 / 0 Constant 0.7812 ± 1.801 Mean 2.056 ± 0.15 Sigma 0.1434 ± 0.1852

0 0.5 1 1.5 2 2.5 3 ± ± ±

(real) for eta bin 11 γγM

Mon Jul 7 17:05:40 2003