bins η invariant mass in γγ→ ^0π

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

/ ndf

2χ 4.401 / 4 Constant 3.417 ± 22.29 Mean 0.004057 ± 0.122 Sigma 0.003284 ± 0.0282

0

5

10

15

20

25

± ± ±

(real) for eta bin 0 γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

/ ndf

2χ 3.692 / 5 Constant 3.761 ± 23.61 Mean 0.003452 ± 0.1225 Sigma 0.003599 ± 0.02747

0

5

10

15

20

25 ± ± ±

(real) for eta bin 1 γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

/ ndf

2χ 0.4576 / 5 Constant 3.142 ± 25.32 Mean 0.003771 ± 0.1252 Sigma 0.003084 ± 0.03387

0

5

10

15

20

25 ± ± ±

(real) for eta bin 2 γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

/ ndf

2χ 2.935 / 4 Constant 4.428 ± 37.18 Mean 0.002303 ± 0.126 Sigma 0.001771 ± 0.0239

0 5 10 15 20 25 30 35 ± ± ±

(real) for eta bin 3 γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

/ ndf

2χ 9.145 / 7 Constant 3.831 ± 25.68 Mean 0.002933 ± 0.1281 Sigma 0.002631 ± 0.02551

0

5

10

15

20

25

± ± ±

(real) for eta bin 4 γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

/ ndf

2χ 2.746 / 4 Constant 4.595 ± 32.62 Mean 0.002444 ± 0.138 Sigma 0.002176 ± 0.0224

0 5 10 15 20 25 30 35 ± ± ±

(real) for eta bin 5 γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

/ ndf

2χ 7.892 / 6 Constant 3.843 ± 21.68 Mean 0.003744 ± 0.1408 Sigma 0.003677 ± 0.02697

0

5

10

15

20

25

± ± ±

(real) for eta bin 6 γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

/ ndf

2χ 12.05 / 3 Constant 2.584 ± 13.03 Mean 0.004093 ± 0.1312 Sigma 0.002809 ± 0.0225

0 2 4 6 8 10 12 14 16 18 20 ± ± ±

(real) for eta bin 7 γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

/ ndf

2χ 5.423 / 4 Constant 2.084 ± 7.323 Mean 0.006307 ± 0.1346 Sigma 0.005858 ± 0.02702

0

2

4

6

8

10 ± ± ±

(real) for eta bin 8 γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

/ ndf

2χ 6.429 / 5 Constant 3.947 ± 11.44 Mean 0.006499 ± 0.134 Sigma 0.006524 ± 0.02144

0 2 4 6 8 10 12 14 16 ± ± ±

(real) for eta bin 9 γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

/ ndf

2χ 1.322 / 3 Constant 2.644 ± 12.16 Mean 0.004617 ± 0.1401 Sigma 0.003863 ± 0.02301

0 2 4 6 8 10 12 ± ± ±

(real) for eta bin 10 γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

/ ndf

2χ 2.385 / 3 Constant 2.861 ± 9.178 Mean 0.004831 ± 0.132 Sigma 0.004998 ± 0.02063

0

2

4

6

8

10

12 ± ± ±

(real) for eta bin 11 γγM

Mon Jul 7 17:10:31 2003