bins η invariant mass in γγ→ ^0π

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

/ ndf

2χ 6.748 / 6 Constant 4.559 ± 30.06 Mean 0.002716 ± 0.1289 Sigma 0.002714 ± 0.02426

0 5 10 15 20 25 30 35 ± ± ±

(real) for eta bin 0 γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

/ ndf

2χ 11.64 / 6 Constant 4.698 ± 32.07 Mean 0.002734 ± 0.1351 Sigma 0.002713 ± 0.025

0 5 10 15 20 25 30 35 ± ± ±

(real) for eta bin 1 γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

/ ndf

2χ 3.716 / 6 Constant 4.485 ± 41.54 Mean 0.002443 ± 0.1358 Sigma 0.002142 ± 0.02918

0 5 10 15 20 25 30 35 40 45 ± ± ±

(real) for eta bin 2 γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

/ ndf

2χ 8.463 / 7 Constant 4.815 ± 46.79 Mean 0.002111 ± 0.1331 Sigma 0.001511 ± 0.02467

0

10

20

30

40

50 ± ± ±

(real) for eta bin 3 γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

/ ndf

2χ 9.03 / 5 Constant 4.87±

38.54 Mean 0.002476 ± 0.137 Sigma 0.002044 ± 0.02381

0 5 10 15 20 25 30 35 40 ± ±

(real) for eta bin 4 γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

/ ndf

2χ 2.427 / 5 Constant 4.018 ± 33.88 Mean 0.003233 ± 0.14 Sigma 0.003416 ± 0.03391

0 5 10 15 20 25 30 35 ± ± ±

(real) for eta bin 5 γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

/ ndf

2χ 4.644 / 6 Constant 3.46±

26.98 Mean 0.002915 ± 0.142 Sigma 0.002162 ± 0.0277

0

5

10

15

20

25 ± ±

(real) for eta bin 6 γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

/ ndf

2χ 6.236 / 4 Constant 4.029 ± 31.65 Mean 0.002621 ± 0.1392 Sigma 0.001976 ± 0.02456

0 5 10 15 20 25 30 35 ± ± ±

(real) for eta bin 7 γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

/ ndf

2χ 2.949 / 4 Constant 4.128 ± 33.4 Mean 0.002465 ± 0.1369 Sigma 0.001813 ± 0.02383

0 5 10 15 20 25 30 ± ± ±

(real) for eta bin 8 γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

/ ndf

2χ 0.4582 / 3 Constant 3.542 ± 20.5 Mean 0.00394 ± 0.1342 Sigma 0.004315 ± 0.02701

0 2 4 6 8 10 12 14 16 18 20 22 ± ± ±

(real) for eta bin 9 γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

/ ndf

2χ 3.063 / 2 Constant 2.438 ± 10.93 Mean 0.006524 ± 0.1479 Sigma 0.007538 ± 0.03069

0 2 4 6 8 10 12 14 16 ± ± ±

(real) for eta bin 10 γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

/ ndf

2χ 3.311 / 4 Constant 1.892 ± 8.963 Mean 0.007361 ± 0.1464 Sigma 0.006047 ± 0.0355

0 2 4 6 8 10 12 14 ± ± ±

(real) for eta bin 11 γγM

Mon Jul 7 17:13:22 2003