bins η invariant mass in γγ→ ^0π

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

/ ndf

2χ 5.019 / 7 Constant 2.162 ± 11.85 Mean 0.004964 ± 0.1426 Sigma 0.004124 ± 0.03389

0 2 4 6 8 10 12 14 16 18 ± ± ±

(real) for eta bin 0 γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

/ ndf

2χ 4.839 / 6 Constant 2.985 ± 16.72 Mean 0.003978 ± 0.1497 Sigma 0.003277 ± 0.02691

0 2 4 6 8 10 12 14 16 18 ± ± ±

(real) for eta bin 1 γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

/ ndf

2χ 3.175 / 6 Constant 3.22±

21.37 Mean 0.003506 ± 0.1532 Sigma 0.00334 ± 0.03079

0

5

10

15

20

25 ± ±

(real) for eta bin 2 γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

/ ndf

2χ 19.03 / 6 Constant 3.794 ± 27.88 Mean 0.003019 ± 0.1563 Sigma 0.00239 ± 0.02619

0 5 10 15 20 25 30 ± ± ±

(real) for eta bin 3 γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

/ ndf

2χ 2.954 / 5 Constant 4.21±

27.86 Mean 0.002647 ± 0.1473 Sigma 0.002434 ± 0.02326

0

5

10

15

20

25

30 ± ±

(real) for eta bin 4 γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

/ ndf

2χ 11.52 / 5 Constant 3.295 ± 25.38 Mean 0.003776 ± 0.1501 Sigma 0.003125 ± 0.03316

0 5 10 15 20 25 30 35 ± ± ±

(real) for eta bin 5 γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

/ ndf

2χ 11.36 / 5 Constant 5.463 ± 34.52 Mean 0.002354 ± 0.1389 Sigma 0.002439 ± 0.01919

0 5 10 15 20 25 30 35 ± ± ±

(real) for eta bin 6 γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

/ ndf

2χ 10.64 / 5 Constant 5.215 ± 28.01 Mean 0.003115 ± 0.144 Sigma 0.003911 ± 0.02521

0 5 10 15 20 25 30 35 ± ± ±

(real) for eta bin 7 γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

/ ndf

2χ 15.21 / 6 Constant 4.617 ± 20.19 Mean 0.004536 ± 0.1471 Sigma 0.007238 ± 0.03297

0 5 10 15 20 25 30 ± ± ±

(real) for eta bin 8 γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

/ ndf

2χ 9.124 / 5 Constant 3.674 ± 17.41 Mean 0.004331 ± 0.1354 Sigma 0.006028 ± 0.03194

0

5

10

15

20

25

± ± ±

(real) for eta bin 9 γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

/ ndf

2χ 3.11 / 5 Constant 2.219 ± 11.69 Mean 0.004843 ± 0.1469 Sigma 0.003516 ± 0.02899

0

2

4

6

8

10

12 ± ± ±

(real) for eta bin 10 γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

/ ndf

2χ 8.156 / 5 Constant 1.756 ± 7.654 Mean 0.006207 ± 0.1452 Sigma 0.004893 ± 0.03173

0 2 4 6 8 10 12 ± ± ±

(real) for eta bin 11 γγM

Mon Jul 7 17:25:20 2003