bins η invariant mass in γγ→ ^0π

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

/ ndf

2χ 2.253 / 7 Constant 1.64±

6.484 Mean 0.007185 ± 0.1636 Sigma 0.00723 ± 0.03815

0 1 2 3 4 5 6 7 ± ±

(real) for eta bin 0 γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

/ ndf

2χ 1.325 / 3 Constant 2.498 ± 10.86 Mean 0.008332 ± 0.1661 Sigma 0.01275 ± 0.03895

0 2 4 6 8 10 12 ± ± ±

(real) for eta bin 1 γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

/ ndf

2χ 1.85 / 4 Constant 2.3±

10.65 Mean 0.004901 ± 0.1786 Sigma 0.003843 ± 0.02661

0

2

4

6

8

10 ± ±

(real) for eta bin 2 γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

/ ndf

2χ 7.298 / 5 Constant 1.914 ± 9.53 Mean 0.007295 ± 0.1773 Sigma 0.007843 ± 0.04179

0 2 4 6 8 10 12 14 ± ± ±

(real) for eta bin 3 γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

/ ndf

2χ 5.567 / 6 Constant 2.829 ± 15.15 Mean 0.004788 ± 0.169 Sigma 0.004498 ± 0.03197

0 2 4 6 8 10 12 14 16 18 20 ± ± ±

(real) for eta bin 4 γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

/ ndf

2χ 2.182 / 5 Constant 2.497 ± 13.83 Mean 0.007102 ± 0.1537 Sigma 0.007492 ± 0.03895

0 2 4 6 8 10 12 14 16 ± ± ±

(real) for eta bin 5 γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

/ ndf

2χ 5.002 / 6 Constant 4.054 ± 22.23 Mean 0.003123 ± 0.1583 Sigma 0.003198 ± 0.02369

0

5

10

15

20

25 ± ± ±

(real) for eta bin 6 γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

/ ndf

2χ 7.284 / 5 Constant 2.466 ± 12.34 Mean 0.00511 ± 0.1535 Sigma 0.004226 ± 0.02979

0 2 4 6 8 10 12 14 16 18 ± ± ±

(real) for eta bin 7 γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

/ ndf

2χ 3.56 / 5 Constant 2.475 ± 10.64 Mean 0.005272 ± 0.1521 Sigma 0.005919 ± 0.03146

0 2 4 6 8 10 12 14 ± ± ±

(real) for eta bin 8 γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

/ ndf

2χ 14.12 / 6 Constant 4.217 ± 25.36 Mean 0.002814 ± 0.138 Sigma 0.002289 ± 0.02044

0

5

10

15

20

25 ± ± ±

(real) for eta bin 9 γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

/ ndf

2χ 4.085 / 6 Constant 2.246 ± 10.47 Mean 0.006032 ± 0.1471 Sigma 0.006451 ± 0.03604

0 2 4 6 8 10 12 14 ± ± ±

(real) for eta bin 10 γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

/ ndf

2χ 2.807 / 6 Constant 1.602 ± 8.281 Mean 0.007994 ± 0.1633 Sigma 0.006362 ± 0.04569

0

2

4

6

8

10 ± ± ±

(real) for eta bin 11 γγM

Mon Jul 7 17:36:10 2003